export const THRESH_HOLD = 12;  //  hours
export const DURATION_TIME = 10; // minutes

export const MASTER_MANAGE = "660131a4-788c-4739-a082-cbbf7879cbf2";

export const ASSIGN_USER_TO_PROJECT = "81ab8a87-8ccd-4015-a917-0627cee6a100";

export const INFRASTRUCTURE = "9666de86-d7c7-4d3d-acaa-fcd6d6b81f3c";

export const MANAGE_PROJECT = "53176ebf-c75d-42e5-839f-4508ffac3def"

export const MANAGE_EMPLOYEES = "81ab8a87-8ccd-4015-a917-0627cee6a100"

export const MANAGE_INFRA = "9666de86-d7c7-4d3d-acaa-fcd6d6b81f3c"