export const THRESH_HOLD = 48;  //  hours
export const DURATION_TIME = 10; // minutes
export const OTP_EXPIRY_SECONDS = 600  // OTP time

export const MANAGE_MASTER = "588a8824-f924-4955-82d8-fc51956cf323";

export const MANAGE_PROJECT = "172fc9b6-755b-4f62-ab26-55c34a330614"

export const VIEW_PROJECTS = "6ea44136-987e-44ba-9e5d-1cf8f5837ebc"

export const MANAGE_EMPLOYEES = "a97d366a-c2bb-448d-be93-402bd2324566"

export const MANAGE_PROJECT_INFRA = "f2aee20a-b754-4537-8166-f9507b44585b"

export const VIEW_PROJECT_INFRA = "c7b68e33-72f0-474f-bd96-77636427ecc8"

export const REGULARIZE_ATTENDANCE ="57802c4a-00aa-4a1f-a048-fd2f70dd44b6"


export const ASSIGN_TO_PROJECT = "b94802ce-0689-4643-9e1d-11c86950c35b";

export const INFRASTRUCTURE = "9666de86-d7c7-4d3d-acaa-fcd6d6b81f3c";

export const MANAGE_TASK = "08752f33-3b29-4816-b76b-ea8a968ed3c5"

export const VIEW_TASK = "9fcc5f87-25e3-4846-90ac-67a71ab92e3c"

export const ASSIGN_REPORT_TASK = "6a32379b-8b3f-49a6-8c48-4b7ac1b55dc2"

