export const THRESH_HOLD = 12;  //  hours
export const DURATION_TIME = 10; // minutes

export const MANAGE_MASTER = "588a8824-f924-4955-82d8-fc51956cf323";

export const MANAGE_PROJECT = "172fc9b6-755b-4f62-ab26-55c34a330614"

export const MANAGE_EMPLOYEES = "a97d366a-c2bb-448d-be93-402bd2324566"

export const MANAGE_PROJECT_INFRA = "f2aee20a-b754-4537-8166-f9507b44585b"

export const VIEW_PROJECT_INFRA = "c7b68e33-72f0-474f-bd96-77636427ecc8"

export const REGULARIZE_ATTENDANCE ="57802c4a-00aa-4a1f-a048-fd2f70dd44b6"


export const ASSIGN_TO_PROJECT = "fbd213e0-0250-46f1-9f5f-4b2a1e6e76a3";

export const INFRASTRUCTURE = "9666de86-d7c7-4d3d-acaa-fcd6d6b81f3c";



